/*
 *	aegis - project change supervisor
 *	Copyright (C) 2000, 2002, 2006, 2008 Peter Miller
 *
 *	This program is free software; you can redistribute it and/or modify
 *	it under the terms of the GNU General Public License as published by
 *	the Free Software Foundation; either version 3 of the License, or
 *	(at your option) any later version.
 *
 *	This program is distributed in the hope that it will be useful,
 *	but WITHOUT ANY WARRANTY; without even the implied warranty of
 *	MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
 *	GNU General Public License for more details.
 *
 *	You should have received a copy of the GNU General Public License
 *	along with this program. If not, see
 *	<http://www.gnu.org/licenses/>.
 *
 * Missing rows are taken to mean that the test was not run.
 *
 * If this file is changed, don't forget to update lib/??/man5/aetest.5
 */

test_result =
[
	{
		/*
		 * The name of the file containing the test.
		 */
		file_name = string;

		/*
		 * The exit status of running the test file.
		 */
		exit_status = integer;

		/*
		 * The architecture name to which the result applies.
		 * If not set, defaults to the architecture of the
		 * executing system.
		 */
		architecture = string;
	}
];
